<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\documentclass{scrartcl}
\usepackage[mouseover]{ocgtools}
\begin{document}
\section{Test}
This is a \ocgminitextrt{OCG layer test}{Test Test
Test}

\newpage
\section{Second page}
The OCGtools does not (yet) work well on PDF files consistion from one page.
\end{document}</pre></body></html>